import "@/global.css";

import { GluestackUIProvider } from "@/components/ui/gluestack-ui-provider";
import { StatusBar } from "expo-status-bar";
import { Stack } from "expo-router";
import { SafeAreaView } from "react-native-safe-area-context";

export default function RootLayout() {
  return (
    <GluestackUIProvider>
      <SafeAreaView style={{ flex: 1 }}>
        <StatusBar style="auto" />
        <Stack screenOptions={{ headerShown: false }} />
      </SafeAreaView>
    </GluestackUIProvider>
  );
}
